-- phpMyAdmin SQL Dump
-- version 4.1.14
-- http://www.phpmyadmin.net
--
-- Client :  127.0.0.1
-- Généré le :  Mer 24 Juin 2015 à 09:14
-- Version du serveur :  5.6.17
-- Version de PHP :  5.5.12

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Base de données :  `db_mesures`
--

-- --------------------------------------------------------

--
-- Structure de la table `table_mesures`
--

CREATE TABLE IF NOT EXISTS `table_mesures` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `jourheure` datetime NOT NULL,
  `mesure1` int(11) NOT NULL,
  `mesure2` int(11) NOT NULL,
  `commentaire` text NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB  DEFAULT CHARSET=latin1 COMMENT='Table des mesures' AUTO_INCREMENT=16 ;

--
-- Contenu de la table `table_mesures`
--

INSERT INTO `table_mesures` (`id`, `jourheure`, `mesure1`, `mesure2`, `commentaire`) VALUES
(1, '2015-06-18 10:12:46', 100, -100, ''),
(2, '2015-06-18 10:13:01', 100, 50, ''),
(3, '2015-06-18 10:18:51', 131, 12, ''),
(4, '2015-06-18 10:19:03', 100, 50, ''),
(5, '2015-06-18 10:19:16', 131, 12, ''),
(6, '2015-06-18 10:19:23', 100, 50, ''),
(7, '2015-06-18 10:19:33', 255, 255, ''),
(8, '2015-06-18 10:19:46', 100, 50, ''),
(9, '2015-06-18 10:20:06', 253, 244, ''),
(10, '2015-06-18 10:20:13', 100, 50, ''),
(11, '2015-06-18 10:39:01', 255, 253, ''),
(12, '2015-06-18 11:39:28', 255, 255, ''),
(13, '2015-06-18 11:39:35', 100, 50, ''),
(14, '2015-06-18 11:39:46', 0, 230, ''),
(15, '2015-06-18 11:39:50', 100, 50, '');

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
